From d8cc3eeeb55b92b0d7fe9a325937df11c28fbcaa Mon Sep 17 00:00:00 2001
From: Aqua-sama <aqua@iserlohn-fortress.net>
Date: Sun, 12 Jan 2020 17:05:25 +0200
Subject: Update doc/ and move various entries to wiki

---
 doc/Building/Breakpad.asciidoc | 44 ------------------------------------------
 1 file changed, 44 deletions(-)
 delete mode 100644 doc/Building/Breakpad.asciidoc

(limited to 'doc/Building/Breakpad.asciidoc')

diff --git a/doc/Building/Breakpad.asciidoc b/doc/Building/Breakpad.asciidoc
deleted file mode 100644
index aa2642e..0000000
--- a/doc/Building/Breakpad.asciidoc
+++ /dev/null
@@ -1,44 +0,0 @@
-== Breakpad
-
-=== Enabling breakpad
-Use the `-DBreakpad=enabled` option. This requires Breakpad be installed as a package.
-
-=== Building breakpad on linux
-[source, sh]
-----
-# Get the missing linux syscall support header
-if [ ! -f breakpad.git/src/third_party/lss/linux_syscall_support.h ]; then
-    mkdir -p breakpad.git/src/third_party/lss
-    curl -L https://chromium.googlesource.com/linux-syscall-support/+/master/linux_syscall_support.h?format=TEXT | base64 --decode > breakpad.git/src/third_party/lss/linux_syscall_support.h
-fi
-
-buildpath=$(pwd)/build
-if [ ! -d $buildpath ]; then
-    mkdir $buildpath
-fi
-
-installpath=$(pwd)/install
-if [ ! -d $installpath ]; then
-    mkdir $installpath
-fi
-
-cd $buildpath
-../breakpad.git/configure --prefix=$installpath
-make
-make install
-----
-
-=== Producing symbols
-[source, sh]
-----
-tools/linux/dump_syms/dump_syms ./poi > poi.sym
-head -n1 poi.sym
-mkdir -p ./symbols/poi/<hex>
-mv poi.sym ./symbols/poi/<hex>
-----
-
-=== Processing minidump
-[source, sh]
-----
-processor/minidump_stackwalk minidump.dmp ./symbols
-----
-- 
cgit v1.2.1

