From 5fe4b752fec9b56da213c38127cab4e70efddc6d Mon Sep 17 00:00:00 2001
From: Aqua-sama <aqua@iserlohn-fortress.net>
Date: Mon, 11 Feb 2019 20:25:02 +0200
Subject: Add configure script

Configure script is not needed when building, it is provided as a
convenience tool. Requires python3.
---
 doc/Development/meson.asciidoc | 30 ------------------------------
 1 file changed, 30 deletions(-)
 delete mode 100644 doc/Development/meson.asciidoc

(limited to 'doc/Development/meson.asciidoc')

diff --git a/doc/Development/meson.asciidoc b/doc/Development/meson.asciidoc
deleted file mode 100644
index 1eb08c6..0000000
--- a/doc/Development/meson.asciidoc
+++ /dev/null
@@ -1,30 +0,0 @@
-==== Setting compiler
-Compiler can only be set when initially configuring the build, and cannot be
-changed with --reconfigure:
-
-[source, sh]
-----
-export CXX="ccache clang++"
-meson build-path
-----
-
-==== Setting linker
-[source, sh]
-----
-build% meson configure -Dcpp_link_args='-fuse_ld=gold'
-----
-
-==== Listing build options
-[source, sh]
-----
-build% meson configure
-----
-
-==== Changing build options
-[source, sh]
-----
-build% meson configure -D<option-name>=<enabled|disabled>
-# for example:
-build% meson configure -DPlasma=enabled
-----
-
-- 
cgit v1.2.1

