From d8cc3eeeb55b92b0d7fe9a325937df11c28fbcaa Mon Sep 17 00:00:00 2001
From: Aqua-sama <aqua@iserlohn-fortress.net>
Date: Sun, 12 Jan 2020 17:05:25 +0200
Subject: Update doc/ and move various entries to wiki

---
 doc/Usage/Configuration.asciidoc | 14 --------------
 1 file changed, 14 deletions(-)
 delete mode 100644 doc/Usage/Configuration.asciidoc

(limited to 'doc/Usage/Configuration.asciidoc')

diff --git a/doc/Usage/Configuration.asciidoc b/doc/Usage/Configuration.asciidoc
deleted file mode 100644
index b1dbec5..0000000
--- a/doc/Usage/Configuration.asciidoc
+++ /dev/null
@@ -1,14 +0,0 @@
-== Configuration
-
-The Configuration is loaded from the path specified by `--config`, by default
-_~/.config/smolbote/smolbote.cfg_.
-
-You can set the value of configuration options using its name in a key=value
-pair, for example:
-[source, ini]
-----
-mainwindow.height=600
-----
-For a full list of options, check `--help`.
-
-You can overwrite options at runtime using the option name as a parameter.
-- 
cgit v1.2.1

