From 2a696a57abafb25978aef1af5758fe75b706d1f0 Mon Sep 17 00:00:00 2001
From: Aqua-sama <aqua@iserlohn-fortress.net>
Date: Wed, 16 Jan 2019 16:52:07 +0100
Subject: Rewrite lib/web to lib/webprofile

- libweb was supposed to be a general QtWebEngine wrapper, but only
  turned out to do profiles and profile management. The new name should
  make this more obvious.
- Renamed ProfileManager to WebProfileManager, and cut out duplicate
  code.
- Temporary profiles: temporary profiles are not kept after closing the
  browser.
---
 doc/Usage/Profile.asciidoc | 6 ++++++
 1 file changed, 6 insertions(+)

(limited to 'doc/Usage/Profile.asciidoc')

diff --git a/doc/Usage/Profile.asciidoc b/doc/Usage/Profile.asciidoc
index 9b00dbc..79506fd 100644
--- a/doc/Usage/Profile.asciidoc
+++ b/doc/Usage/Profile.asciidoc
@@ -2,6 +2,12 @@
 A Profile is a collection of settings, policies, scripts, cookies, cache and
 history. Profiles can be used to isolate pages from each other.
 
+Off-the-record profiles only use in-memory cache and save no files to disk.
+
+Profiles can be either temporary or permanent. Temporary profiles are expire
+when the application is closed, whereas permanent profiles are kept between
+runs.
+
 Each window has a default profile it uses when opening new tabs. This can be
 changed from the window's menu. Additionally, tabs can have their profiles
 individually changed from their context menu.
-- 
cgit v1.2.1

