==== Setting compiler
Compiler can only be set when initially configuring the build, and cannot be
changed with --reconfigure:

[source, sh]
----
export CXX="ccache clang++"
meson build-path
----

==== Setting linker
[source, sh]
----
build% meson configure -Dcpp_link_args='-fuse_ld=gold'
----

==== Listing build options
[source, sh]
----
build% meson configure
----

==== Changing build options
[source, sh]
----
build% meson configure -D<option-name>=<enabled|disabled>
# for example:
build% meson configure -DPlasma=enabled
----

==== Prevent meson from downloading wraps
During configure, meson can download missing dependencies on its own using
wraps. To disable this, pass '--wrap-mode=nodownload' during the configure
phase:
[source, sh]
----
repo% meson --wrap-mode=nodownload build-path
----

