==== Setting compiler
Compiler can only be set when initially configuring the build, and cannot be
changed with --reconfigure:

[source, sh]
----
export CXX="ccache clang++"
meson build-path
----

==== Setting linker
[source, sh]
----
build% meson configure -Dcpp_link_args='-fuse_ld=gold'
----

==== Listing build options
[source, sh]
----
build% meson configure
----

==== Changing build options
[source, sh]
----
build% meson configure -D<option-name>=<enabled|disabled>
# for example:
build% meson configure -DPlasma=enabled
----

