== Configuration

The Configuration is loaded from the path specified by `--config`, by default
_~/.config/smolbote/smolbote.cfg_.

You can set the value of configuration options using its name in a key=value
pair, for example:
[source, ini]
----
mainwindow.height=600
----
For a full list of options, check `--help`.

You can overwrite options at runtime using the option name as a parameter.
